Copyright: Copyright © 1994-1997 Symantec Corp.
Citation: Copyright © 1994-1997 Symantec Corp.


Conceptos básicos: Norton Registry Tracker

Norton Registry Tracker le ayuda a monitorizar los cambios efectuados en archivos, carpetas y claves de registro que son cruciales en el sistema. Norton Registry Tracker toma "imágenes" automáticamente de los elementos monitorizados cuando cambian, mostrándole las modificaciones realizadas y permitiéndole restaurar los elementos monitorizados a su estado anterior con las funciones Recuperación Rápida y Restaurar.

La mayoría de las aplicaciones efectúan cambios en el registro o en un archivo de inicialización (INI) en el momento de ser instaladas. En algunos casos, estos cambios pueden resultarle insatisfactorios. Crear y mantener una "auditoría" de las imágenes del sistema con Norton Registry Tracker puede ahorrarle horas de frustrantes pruebas para restaurar el sistema a su estado original.

Además de claves de registro y archivos de texto, Norton Registry Tracker permite monitorizar cambios en archivos de datos y carpetas del sistema. Los archivos de datos almacenan información en forma binaria (no texto) y frecuentemente tienen una extensión de archivo DAT. Aunque que Norton Registry Tracker no puede mostrar los cambios exactos efectuados en este tipo de archivos, permite recuperar versiones anteriores en caso de que los datos se dañen. Siempre que se efectúa un cambio en una carpeta monitorizada, Norton Registry Tracker toma una imagen para mostrar qué archivos han sido añadidos o borrados.

Se puede configurar Norton Registry Tracker para que inicie automáticamente y se ejecute en segundo plano siempre que inicie Windows. El icono de cámara en el área de notificación (lado derecho) de la barra de tareas de Windows indica que Norton Registry Tracker se está ejecutando y está monitorizando cambios continuamente en los elementos especificados para su monitorización.

Si decide no ejecutar Norton Registry Tracker continuamente en segundo plano, le recomendamos que lo ejecute por lo menos cuando añada, modifique o elimine hardware o software de su sistema. Norton Registry Tracker toma una nueva imagen cuando inicie, llevando así un registro de los elementos monitorizados en el sistema en los momentos de cambios críticos.

Para monitorizar los cambios, haga clic aquí [image] para iniciar Norton Registry Tracker.

 Temas relacionados


Acerca de los elementos monitorizados

Por defecto, Norton Registry Tracker monitoriza los siguientes elementos del ordenador:

La carpeta Windows (normalmente C:\WINDOWS)

La carpeta Sistema de Windows (generalmente C:\WINDOWS\SYSTEM)

La clave de registro HKEY_LOCAL_MACHINE\SOFTWARE y las subclaves que contiene

WIN.INI

SYSTEM.INI

CONFIG.SYS

AUTOEXEC.BAT

Puede especificar elementos adicionales a monitorizar y eliminar la monitorización de cualquiera de los elementos por defecto si lo desea. Escoja Configuración en el menú Opciones para especificar elementos a monitorizar. En la ficha Claves de registro puede especificar si Norton Registry Tracker debe monitorizar sólo una clave (Clave de monitorización) o la clave junto con todas las subclaves que contiene (Clave de subárbol).

Siempre que Norton Registry Tracker detecta un cambio en uno de los elementos monitorizados, toma una nueva imagen. De esta forma, cada nueva imagen graba los cambios efectuados desde la primera imagen que se tomó. En conjunto, las imágenes de Norton Registry Tracker proporcionan un registro de modificaciones efectuadas en los elementos monitorizados. Norton Registry Tracker puede utilizar estas imágenes para restaurar cualquier elemento monitorizado al estado en que estaba en el momento de la imagen.

Monitorizar elementos que cambian continuamente, como claves dinámicas de registro o el archivo de intercambio de Windows, hace que se creen imágenes frecuentes. Es mejor no monitorizar este tipo de elementos, es decir, marcarlos como exclusiones de monitorización. Por otra parte, puede que desee monitorizar una base de datos o un archivo de procesador de textos mientras trabaja en él, para tener un historial de los cambios que pueda deshacer si es necesario.

 Temas relacionados


Excluir elementos de la monitorización

En algunos casos, puede que desee no monitorizar un elemento en particular:

Windows mantiene automáticamente un conjunto de claves de registro que registran estadísticas de funcionamiento para varias funciones del sistema. Estos valores se actualizan continuamente, pero no tienen ningún efecto en el sistema. Si monitorizara estos cambios, Norton Registry Tracker tomaría imágenes frecuentes e innecesarias.

El tamaño del archivo de intercambio de Windows cambia de forma dinámica según las necesidades del sistema. Si monitorizara la carpeta que contiene este archivo, Norton Registry Tracker tomaría una nueva imagen cada vez que hubiera una alteración en el archivo de intercambio. Por esta razón, el archivo de intercambio de Windows se excluye de la monitorización automática.

Algunos archivos de inicialización (INI) incluyen secciones cuyos contenidos son actualizados frecuentemente por sus aplicaciones asociadas. Puesto que estos datos no son vitales para el funcionamiento del sistema, puede que no desee que estas secciones sean monitorizadas.

Normalmente no se monitoriza estos tipos de claves de registro y de archivos. Pero si escoge monitorizar las claves de registro o la carpeta que los contiene, estos elementos estarán incluidos automáticamente en la monitorización. Esto puede impedirse excluyendo específicamente este tipo de elementos.

Es fácil excluir claves de registro, archivos, carpetas o secciones de archivo INI de la monitorización con Norton Registry Tracker. Haga clic con el botón derecho del ratón en el elemento dentro del Registro de imagen que desea excluir de futuras monitorizaciones y escoja Excluir.

Los valores de registro no pueden excluirse de la monitorización: sólo pueden excluirse las claves que los contienen.

Las exclusiones también pueden excluirse fácilmente en las fichas del cuadro de diálogo Configuración. Marque la casilla Mostrar exclusiones, seleccione el elemento excluido que desea incluir en futuras monitorizaciones y haga clic en Suprimir para suprimir esa exclusión. En la ficha Claves de registro puede especificar si debe excluirse un clave sola (Clave de exclusión) o la clave junto con las subclaves que contiene (Subclave de exclusión).

 Temas relacionados


Editar EXCLUDE.INI

Norton Registry Tracker usa su propio archivo INI para monitorizar dos tipos de exclusiones:

Archivos excluidos de la monitorización de la carpeta que los contiene

Entradas específicas de archivos INI excluidas de la monitorización del archivo INI al que pertenecen

Estos tipos de exclusiones se especifican en el archivo EXCLUDE.INI, que se almacena en la carpeta REGTRK en Norton Utilities. Normalmente, este archivo se actualiza automáticamente siempre que se añaden o eliminan estos tipos de exclusiones pero, si lo desea, puede editarlo. Utilice su editor de textos preferido, como el Bloc de Notas de Windows.

EXCLUDE.INI está dividido en secciones, cada una de las cuales representa una carpeta o archivo INI monitorizados. Las entradas de las secciones de carpetas representan archivos; las entradas de las secciones de archivo INI representan entradas de esos archivos INI. Si una entrada está configurada como igual a uno, el archivo o entrada INI que representa queda excluida de la monitorización. Norton Registry Tracker no tiene en cuenta los cambios en estos archivos o entradas INI.

Si se borran entradas de EXCLUDE.INI, Norton Registry Tracker monitoriza los correspondientes archivos o entradas de archivo INI otra vez.

 Temas relacionados


Acerca de las imágenes de Norton Registry Tracker

Siempre que Norton Registry Tracker detecta un cambio en un elemento monitorizado, toma una nueva imagen. Cada imagen captura el estado de los elementos monitorizados del sistema. Hay tres tipos principales de eventos que hacen que Norton Registry Tracker tome una imagen:

Siempre que inicia Norton Registry Tracker, toma una imagen para que sirva de registro base del estado inicial de los elementos monitorizados. Si esta imagen difiere de la última imagen almacenada en el sistema o si es la primera vez que ejecuta Norton Registry Tracker, la imagen se denomina "Imagen inicial".

Siempre que Norton Registry Tracker detecta un cambio en un elemento monitorizado toma una nueva imagen. Esto permite comparar la imagen con imágenes anteriores para ver qué cambios se han efectuado. Tener una serie de imágenes también permite restaurar el sistema al estado en que se encontraba antes de los cambios grabados en las imágenes.

También puede hacer que Norton Registry Tracker tome una imagen ("imagen manual") en cualquier momento. Es conveniente tomar una imagen manual antes de efectuar cambios importantes en el sistema, como al instalar nuevo hardware o software. Al tomar una imagen manual se puede dar a la imagen el nombre que se desee.

Para que le sea más fácil hallar los cambios rápidamente, las imágenes de Norton Registry Tracker pueden mostrar sólo los elementos que han cambiado desde la imagen anterior.

 Temas relacionados


Acerca del Registro de imagen

En el Registro de imagen, Norton Registry Tracker muestra una lista de las imágenes que ha tomado.

Siempre que inicia Norton Registry Tracker, éste toma una imagen del sistema. Si esta imagen difiere de la imagen final tomada en la última sesión de Norton Registry Tracker (o si ésta es la primera vez que ejecuta Norton Registry Tracker), esta imagen se denomina "Imagen manual" y funciona como base para grabar el estado inicial de los elementos monitorizados.

Si ya hay una imagen previamente almacenada y Norton Registry Tracker no detecta cambios entre ésta y la nueva imagen, la nueva imagen no se guarda. En este caso, Norton Registry Tracker actualiza la hora de la última comprobación mostrada en la parte superior del Registro de imagen.

Siempre que Norton Registry Tracker detecta un cambio en un elemento monitorizado, toma una nueva imagen para grabar los cambios. Las imágenes automáticas se etiquetan con la fecha y la hora de la imagen, y el programa que efectuó el cambio. También puede hacer que Norton Registry Tracker tome una imagen en cualquier momento, tanto si ha habido cambios en los elementos monitorizados como si no. Estas "imágenes manuales" también se etiquetan con la fecha y la hora. Por defecto, se les da el nombre "imagen manual", pero les puede dar el nombre que desee.

Se puede visualizar el Registro de imagen ordenado "Por archivo" (por elementos monitorizados) o "Por imagen". El Registro se visualiza en un formato similar al que utiliza el Explorador de Windows: los elementos con signo de sumar a la derecha pueden "expandirse" haciendo clic en el signo de sumar para revelar más detalles. En el nivel más profundo (con los elementos totalmente expandidos), el Registro de imagen muestra los cambios efectuados en los elementos monitorizados. Los cambios específicos efectuados en archivos binarios no se visualizan.

Por defecto, el Registro de imagen muestra detalles completos del contenido de la imagen y de los cambios habidos entre imágenes. Use el menú Ver para cambiar el nivel de detalle de la visualización.

El Registro de imagen puede redefinirse escogiendo Redefinir registro de imagen en el menú Opciones. Una vez redefinido el Registro de imagen, Norton Registry Tracker toma automáticamente una nueva imagen para grabar las condiciones de partida de los elementos monitorizados.

Al redefinir el Registro de imagen se borran todas las imágenes existentes y se toma una nueva imagen. Una vez redefinido el Registro de imagen no será posible devolver los elementos monitorizados al estado en que se en que se encontraban antes de la redefinición. Redefina el Registro de imagen solamente si está seguro de que no necesitará restaurar información de las imágenes actualmente almacenadas.

 Temas relacionados


Cómo se visualizan los cambios en los elementos monitorizados

Norton Registry Tracker permite seleccionar las claves de registro y secciones del archivo INI que deben monitorizarse. Siempre que se efectúa un cambio en un elemento monitorizado, el cambio se graba en el Registro de imagen.

Los cambios en los elementos monitorizados se indican mediante iconos situados a la izquierda de los elementos:

Indica algo que ha sido añadido.

Indica algo que ha sido eliminado.

Indica una línea de un archivo de texto que se ha desplazado dentro del archivo.
El texto desplazado va precedido por el número de línea desde el que se ha desplazado el texto.

Indica una línea de un archivo de texto que se ha desplazado dentro del archivo.
El texto desplazado va precedido por el número de línea al que se ha desplazado el texto.

Si desea una guía en pantalla de estos símbolos, escoja Leyenda en el menú Ver.

Una línea desplazada en un archivo de texto se visualiza generalmente en el Registro de imagen como un cambio emparejado: la primera línea indica adónde se ha movido, mientras que bajo ella otra línea indica desde dónde se ha desplazado. A menudo también verá líneas de cambios de añadir /suprimir. Éstas indican un valor existente que ha cambiado, puesto que un cambio significa básicamente borrar el valor antiguo y añadir el valor nuevo.

 Temas relacionados


Recuperar versiones previas de elementos monitorizados

La imagen más reciente de Norton Registry Tracker recoge el estado actual de los elementos monitorizados. Si en algún momento tiene que recuperar versiones anteriores de los elementos monitorizados, Norton Registry Tracker le permite hacerlo de dos maneras:

Recuperación rápida restaura todos los elementos monitorizados desde la imagen inmediatamente anterior a la imagen actual. Devuelve estos elementos al estado en que se encontraban justo antes de la última imagen. Escoja Recuperación rápida en el menú Archivo.

Restaurar restaura elementos monitorizados seleccionados de una imagen específica. Seleccione una imagen del Registro de imagen y a continuación escoja Restaurar en el menú Archivo. Un cuadro de diálogo le permitirá designar qué elementos monitorizados de la imagen deben restaurarse. También puede hacer clic con el botón derecho en una clave de registro del registro de imagen y escoger Restaurar.

Norton Registry Tracker no puede deshacer los cambios efectuados en carpetas monitorizadas.

 Temas relacionados


Para tomar una imagen manual

1	Haga clic aquí [image] para iniciar Norton Registry Tracker.

2	Seleccione Nueva imagen en el menú Archivo.

3	Escriba el nombre de la nueva imagen, o use el nombre por defecto, "Imagen manual".

Si ninguno de los archivos y carpetas monitorizados han cambiado desde la última imagen, la imagen más reciente del registro de imagen simplemente cambia de nombre, adoptando el que el usuario haya especificado en el cuadro de diálogo Nueva imagen ("Imagen manual" es el nombre por defecto).

 Temas relacionados


Para deshacer los cambios más recientes (Recuperación rápida)

1	Haga clic aquí [image] para iniciar Norton Registry Tracker.

2	Escoja Recuperación rápida en el menú Archivo. El cuadro de diálogo Recuperación rápida contiene una lista de los archivos y claves de registro cuyos cambios quedarán anulados.

Una vez que Norton Registry Tracker ha anulado los elementos cambiados, toma otra imagen y le da el nombre de "Imagen después de restaurar". Puesto que los archivos y/o claves de registro se han restaurado, los cambios no pueden tener efecto hasta que el sistema se reinicie. Norton Registry Tracker le ofrece la opción de reiniciar el sistema o continuar con su trabajo.

 Temas relacionados


Para restaurar archivos y claves de registro

1	Haga clic aquí [image] para iniciar Norton Registry Tracker.

2	En el Registro de imagen, haga clic en la imagen desde la que desea restaurar archivos o claves.

3	Escoja Restaurar en el menú Archivo.

4	En la lista, haga clic en los archivos y claves que desea restaurar. Sólo los elementos seleccionados cambiarán.

5	Haga clic en Aceptar.

Registry Tracker restaura los elementos seleccionados y toma una nueva imagen llamada "Imagen después de restaurar".

Según los archivos y claves que haya restaurado, puede que algunos cambios no tengan efecto hasta que se reinicie el sistema. Norton Registry Tracker le pregunta si desea reiniciar o continuar trabajando.

 Temas relacionados


Para comparar versiones de elementos monitorizados

1	Haga clic aquí [image] para iniciar Norton Registry Tracker.

2	Haga clic en un elemento monitorizado en el Registro de imagen.

3	Escoja Comparar en el menú Archivo.

Norton Registry Tracker ejecuta Norton File Compare para comparar versiones del elemento.

Si la versión más reciente del elemento está seleccionada en el Registro de imagen, el elemento se comparará con la versión de la imagen anterior. Si hay una versión más antigua seleccionada en el Registro de imagen, Norton Registry Tracker le ofrece la opción de compararlo con la versión anterior o la actual.

 Temas relacionados


Para excluir elementos de la monitorización

1	Haga clic aquí [image] para iniciar Norton Registry Tracker.

2	En el Registro de imagen, haga clic con el botón derecho en el elemento que quiere excluir de la monitorización.

3	Haga clic en Excluir.

Puede excluir claves de registro de la monitorización, pero no valores específicos del registro.

 Temas relacionados


Para eliminar exclusiones de la monitorización

1	Haga clic aquí [image] para iniciar Norton Registry Tracker.

2	Seleccione Configuración en el menú Opciones.

3	Haga clic en la ficha Archivos de texto, Carpetas o Claves de registro, según convenga.

4	Marque la casilla Mostrar exclusiones (sólo en las fichas Archivos de texto y Carpetas).

5	Si es necesario, haga clic en los signos de sumar para mostrar la exclusión que desea cancelar.

6	Haga clic en la exclusión para seleccionarla.

7	Haga clic en Suprimir.

 Temas relacionados


Para especificar elementos a monitorizar

1	Haga clic aquí [image] para iniciar Norton Registry Tracker.

2	Seleccione Configuración en el menú Opciones.

3	Haga clic en la ficha del tipo de elemento que desea monitorizar. Los archivos INI son Archivos de texto; los archivos binarios son Archivos de datos.

4	Haga clic en Añadir.

5	Seleccione el elemento específico que desea que Norton Registry Tracker comience a monitorizar.

6	Haga clic en Abrir.

Aunque Registry Tracker puede monitorizar cambios en las carpetas, no puede llevar a cabo las funciones Recuperación rápida ni Restaurar partiendo de imágenes.

 Temas relacionados


Para suprimir elementos de la monitorización

1	Haga clic aquí [image] para iniciar Norton Registry Tracker.

2	Seleccione Configuración en el menú Opciones.

3	Haga clic en la ficha correspondiente al tipo de elemento que desea eliminar. Los archivos .INI son Archivos de texto, mientras que los archivos binarios son Archivos de datos.

4	Haga clic en Suprimir.

 Temas relacionados


Para redefinir el Registro de imagen

1	Haga clic aquí [image] para iniciar Norton Registry Tracker.

2	Seleccione Redefinir registro de imagen en el menú Opciones.

Redefinir el registro de imagen borra todas las imágenes existentes y toma una nueva imagen. Después de redefinir el registro de imagen no le será posible devolver elementos monitorizados al estado en que se encontraban antes de la redefinición. Redefina el Registro de imagen sólo si está seguro de que no necesitará recuperar información de las imágenes actualmente existentes.

 Temas relacionados


Para ocultar Norton Registry Tracker

1	Haga clic aquí [image] para iniciar Norton Registry Tracker.

2	Seleccione Ocultar en el menú Archivo.

Para volver a mostrar Norton Registry Tracker, haga clic en el icono de cámara en el área de mensajes de la barra de tareas de Windows (el área de la derecha de la barra de tareas). El Registro de imagen de Norton Registry Tracker volverá a aparecer.

 Temas relacionados


Para abrir Norton Registry Tracker

Cualquiera de los programas de Norton Utilities puede abrirse desde el Integrador de Norton Utilities.

Para abrir Norton Registry Tracker:

1	Haga doble clic en el Integrador de Norton Utilities en el escritorio de Windows.

2	Haga clic en Mantenimiento preventivo en el panel izquierdo.

3	Haga clic en Norton Registry Tracker en el panel derecho.

O bien haga clic aquí [image] para iniciar Norton Registry Tracker ahora.

 Temas relacionados


Para iniciar Norton Registry Tracker al iniciarse Windows

1	Haga clic aquí [image] para iniciar Norton Registry Tracker, si no se está ejecutando ya.

2	Seleccione Configuración en el menú Opciones.

3	Marque Iniciar automáticamente con Windows.

Para que Norton Registry Tracker se ejecute en segundo plano, escoja Ocultar en el menú Archivo. A partir de entonces, Norton Registry Tracker se iniciará automáticamente y se ejecutará en segundo plano siempre que inicie Windows. Para volver a visualizar Norton Registry Tracker, haga clic en el icono de cámara en el área de mensajes de la barra de tareas de Windows (el área de la derecha de la barra de tareas).

 Temas relacionados


Escriba la descripción de la nueva imagen.


Elimina los archivos de datos de la imagen de Norton Registry Tracker.

Redefinir el registro de imagen borra todas la imágenes existentes y toma una nueva imagen. Una vez redefinido el registro de imagen no podrá restaurar elementos monitorizados al estado en que se encontraban antes de ser redefinidos. Redefina el registro de imagen sólo si está seguro de que no tendrá que restaurar información de las imágenes actualmente existentes.


Cancela esta operación sin redefinir Norton Registry Tracker.


Contiene una lista de los archivos monitorizados y de las claves de registro que han sufrido cambios grabados en la última imagen. Estos archivos volverán al estado en que se encontraban inmediatamente antes de la última imagen.


Contiene una lista de los archivos monitorizados y de las claves de registro que han sufrido cambios grabados en la imagen seleccionada. Los elementos que seleccione en esta lista volverán al estado en que se encontraban inmediatamente después de la imagen seleccionada.

Haga clic en los elementos de esta lista para seleccionarlos (destacarlos) y deseleccionarlos. Sólo se restaurarán los elementos seleccionados.


Compara la imagen seleccionada con su versión anterior.


Compara la imagen seleccionada con la imagen actual.


Carga Norton Registry Tracker automáticamente siempre que inicia Windows.


Suprime automáticamente las imágenes antiguas después de un determinado número de días. Para cambiar el número de días entre supresiones, use los botones hacia arriba y hacia abajo en el cuadro de la derecha o escriba un número.


Determina el número máximo de imágenes almacenadas por Norton Registry Tracker. Cuando se toma un número de imágenes superior a éste, las imágenes más antiguas quedan automáticamente suprimidas. Para cambiar el número de imágenes, use los botones hacia arriba y hacia abajo en el cuadro de la derecha o escriba otro número.


Muestra solamente los elementos del Registro de imagen que han cambiado entre imágenes. Si esta casilla no está marcada, cada imagen contiene una lista de todos los elementos monitorizados, haya habido o no cambios entre los elementos.


Determina si los detalles de los cambios aparecen en el Registro de imagen.


Determina si se visualiza o no la leyenda del Registro de imagen. La leyenda se muestra en la parte inferior, en la barra de estado.

Esta opción sólo está disponible cuando Mostrar detalles está marcada.


Muestra todos los archivos de texto monitorizados, por ejemplo, los archivos INI.


Permite especificar un nuevo archivo de texto a monitorizar.


Elimina el archivo de texto seleccionado de la lista de archivos monitorizados e impide que el archivo sea monitorizado en el futuro.


Muestra entradas de archivo INI que se han excluido de la monitorización.


Muestra todos los archivos de datos (en formato binario) monitorizados actualmente.


Permite especificar un nuevo archivo de datos (en formato binario) a monitorizar.


Elimina el archivo de datos (en formato binario) seleccionado de la lista de archivos monitorizados e impide que el archivo sea monitorizado en el futuro.


Muestra todas las carpetas actualmente monitorizadas.


Permite especificar una nueva carpeta a monitorizar.


Elimina la carpeta seleccionada de la lista de carpetas monitorizadas e impide que la carpeta sea monitorizada en el futuro.


Muestra los archivos que han sido excluidos de la monitorización. Norton Registry Tracker ignora los cambios en estos archivos cuando determine que carpetas han cambiado.


Muestra la jerarquía de registro de Windows. Las claves de registro marcadas con un icono de cámara son las que se están monitorizando, las que aparecen marcadas con un icono de cámara y árbol también tienen las subclaves monitorizadas, y las subclaves monitorizadas tienen marcas de verificación en sus iconos de carpeta. Las subclaves excluidas de la monitorización no tienen marcas de verificación en sus carpetas.


Haga clic para monitorizar la clave actualmente seleccionada.


Haga clic para monitorizar la clave actualmente seleccionada y todas las subclaves que contenga.


Haga clic para excluir de la monitorización la clave actualmente seleccionada.


Haga clic para excluir de la monitorización la clave actualmente seleccionada y sus subclaves.


Haga clic para suprimir la marca de la clave seleccionada. A partir de entonces, la clave será monitorizada o excluida sólo si la clave que la contiene está marcada para monitorización o exclusión de subárbol.


Muestra solamente las ramas del registro que se están monitorizando actualmente.


Oculta Norton Registry Tracker. Norton Registry Tracker continúa funcionando en segundo plano, monitorizando cambios en los archivos y carpetas especificados.

Aparece un icono de cámara en el área de mensajes (lado derecho) de la barra de tareas de Windows cuando Norton Registry Tracker está oculto.


Cierra Norton Registry Tracker.

Cerrar Norton Registry Tracker impide que monitorice automáticamente los cambios en el sistema.


Impide que este cuadro de diálogo de confirmación aparezca en el futuro. Marque esta casilla para salir en adelante de Norton Registry Tracker sin mostrar el cuadro de diálogo Cerrar Norton Registry Tracker.